X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/519b431a41a9ab4815a1e4180ee78395b74a85de..58db72fee358d5987139a1b8526c0ca873e07dbf:/src/views/run-process-panel/inputs/boolean-input.tsx

diff --git a/src/views/run-process-panel/inputs/boolean-input.tsx b/src/views/run-process-panel/inputs/boolean-input.tsx
index 6a214e9d..c8ef8850 100644
--- a/src/views/run-process-panel/inputs/boolean-input.tsx
+++ b/src/views/run-process-panel/inputs/boolean-input.tsx
@@ -2,9 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { memoize } from 'lodash/fp';
-import { BooleanCommandInputParameter } from '~/models/workflow';
+import { BooleanCommandInputParameter } from 'models/workflow';
 import { Field } from 'redux-form';
 import { Switch } from '@material-ui/core';
 import { GenericInputProps, GenericInput } from './generic-input';
