X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/4cddd6be7314d0ab3c387b5dcc909780a468410c..3367b1ff2a1d1050bb435f7bc8230c03435b2529:/src/views/workbench/workbench.tsx

diff --git a/src/views/workbench/workbench.tsx b/src/views/workbench/workbench.tsx
index 692c40b8..776850ce 100644
--- a/src/views/workbench/workbench.tsx
+++ b/src/views/workbench/workbench.tsx
@@ -11,6 +11,7 @@ import { ArvadosTheme } from '~/common/custom-theme';
 import { ContextMenu } from "~/views-components/context-menu/context-menu";
 import { FavoritePanel } from "../favorite-panel/favorite-panel";
 import { CurrentTokenDialog } from '~/views-components/current-token-dialog/current-token-dialog';
+import { RichTextEditorDialog } from '~/views-components/rich-text-editor-dialog/rich-text-editor-dialog';
 import { Snackbar } from '~/views-components/snackbar/snackbar';
 import { CollectionPanel } from '../collection-panel/collection-panel';
 import { RenameFileDialog } from '~/views-components/rename-file-dialog/rename-file-dialog';
@@ -119,6 +120,7 @@ export const WorkbenchPanel =
             <PartialCopyCollectionDialog />
             <ProcessCommandDialog />
             <RenameFileDialog />
+            <RichTextEditorDialog />
             <Snackbar />
             <UpdateCollectionDialog />
             <UpdateProcessDialog />
