X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/4bb9d50b428773c4712e8eebdb6756f45efb06f6..01a728d112f5728b9552c7e63f074487a4d056f0:/src/views/workflow-panel/workflow-description-card.tsx?ds=sidebyside

diff --git a/src/views/workflow-panel/workflow-description-card.tsx b/src/views/workflow-panel/workflow-description-card.tsx
index 70fdb6b3..b4b9f20a 100644
--- a/src/views/workflow-panel/workflow-description-card.tsx
+++ b/src/views/workflow-panel/workflow-description-card.tsx
@@ -14,8 +14,7 @@ import {
     TableHead,
     TableCell,
     TableBody,
-    TableRow,
-    Divider
+    TableRow
 } from '@material-ui/core';
 import { ArvadosTheme } from '~/common/custom-theme';
 import { WorkflowIcon } from '~/components/icon/icon';
