X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/4a055bfc98a5fc05cc311e2de1ab2213eec5497e..08ff9a348a1177bb0cf8516f36c5d6a28be3778b:/src/views-components/form-fields/user-form-fields.tsx

diff --git a/src/views-components/form-fields/user-form-fields.tsx b/src/views-components/form-fields/user-form-fields.tsx
index 85634449..11d7d802 100644
--- a/src/views-components/form-fields/user-form-fields.tsx
+++ b/src/views-components/form-fields/user-form-fields.tsx
@@ -18,13 +18,6 @@ export const UserEmailField = () =>
         autoFocus={true}
         label="Email" />;
 
-export const UserIdentityUrlField = () =>
-    <Field
-        name='identityUrl'
-        component={TextField}
-        validate={USER_LENGTH_VALIDATION}
-        label="Identity URL Prefix" />;
-
 export const UserVirtualMachineField = ({ data }: any) =>
     <div style={{ marginBottom: '21px' }}>
         <InputLabel>Virtual Machine</InputLabel>
