X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/464d663738d61871a3a0a88be18e8f79e99bb5f3..015c7956121aceeade3d92243022c51e552d7a32:/src/components/context-menu/context-menu.test.tsx

diff --git a/src/components/context-menu/context-menu.test.tsx b/src/components/context-menu/context-menu.test.tsx
index 5ced213a..31e77200 100644
--- a/src/components/context-menu/context-menu.test.tsx
+++ b/src/components/context-menu/context-menu.test.tsx
@@ -2,9 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
-import { mount, configure, shallow } from "enzyme";
-import * as Adapter from "enzyme-adapter-react-16";
+import React from "react";
+import { mount, configure } from "enzyme";
+import Adapter from "enzyme-adapter-react-16";
 import { ContextMenu } from "./context-menu";
 import { ListItem } from "@material-ui/core";
 import { ShareIcon } from "../icon/icon";
