X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/43551086cc04bb37a2b1dc6c8ec24af44f2acf8d..refs/heads/18207-Workbench2-is-not-clearing-the-project-content-when-switching:/src/views/shared-with-me-panel/shared-with-me-panel.tsx

diff --git a/src/views/shared-with-me-panel/shared-with-me-panel.tsx b/src/views/shared-with-me-panel/shared-with-me-panel.tsx
index 219410c5..7ba9077c 100644
--- a/src/views/shared-with-me-panel/shared-with-me-panel.tsx
+++ b/src/views/shared-with-me-panel/shared-with-me-panel.tsx
@@ -55,7 +55,11 @@ export const SharedWithMePanel = withStyles(styles)(
                     onRowDoubleClick={this.handleRowDoubleClick}
                     onContextMenu={this.handleContextMenu}
                     contextMenuColumn={false}
-                    dataTableDefaultView={<DataTableDefaultView icon={ShareMeIcon} />} /></div>;
+                    dataTableDefaultView={
+                        <DataTableDefaultView
+                            icon={ShareMeIcon}
+                            messages={['No shared items']} />
+                    } /></div>;
             }
 
             handleContextMenu = (event: React.MouseEvent<HTMLElement>, resourceUuid: string) => {
