X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/3f639fdc993a3723c4bf98621bc291aa139d5e09..c88bb4d5e97a168a4f2209112bdac97577eb35f9:/src/views-components/advanced-tab-dialog/advanced-tab-dialog.tsx

diff --git a/src/views-components/advanced-tab-dialog/advanced-tab-dialog.tsx b/src/views-components/advanced-tab-dialog/advanced-tab-dialog.tsx
index 7a85078d..bc84ed2c 100644
--- a/src/views-components/advanced-tab-dialog/advanced-tab-dialog.tsx
+++ b/src/views-components/advanced-tab-dialog/advanced-tab-dialog.tsx
@@ -69,7 +69,7 @@ export const AdvancedTabDialog = compose(
                 maxWidth="lg"
                 onClose={closeDialog}
                 onExit={() => this.setState({ value: 0 })} >
-                <DialogTitle>Advanced</DialogTitle>
+                <DialogTitle>API Details</DialogTitle>
                 <Tabs value={value} onChange={this.handleChange} fullWidth>
                     <Tab label="API RESPONSE" />
                     <Tab label="METADATA" />
