X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/3dad010ab289e3409827221ee2a337b4417ee5df..cfe5ff035578ede95613b0c545708466da78cbea:/src/views/process-panel/process-log-code-snippet.tsx

diff --git a/src/views/process-panel/process-log-code-snippet.tsx b/src/views/process-panel/process-log-code-snippet.tsx
index eb3ede6f..1ea83912 100644
--- a/src/views/process-panel/process-log-code-snippet.tsx
+++ b/src/views/process-panel/process-log-code-snippet.tsx
@@ -38,13 +38,14 @@ const theme = createMuiTheme({
 
 interface ProcessLogCodeSnippetProps {
     lines: string[];
+    fontSize: number;
     wordWrap?: boolean;
 }
 
 export const ProcessLogCodeSnippet = withStyles(styles)(
     (props: ProcessLogCodeSnippetProps & WithStyles<CssRules>) =>
         <MuiThemeProvider theme={theme}>
-            <CodeSnippet lines={props.lines}
+            <CodeSnippet lines={props.lines} fontSize={props.fontSize}
                 className={props.wordWrap ? props.classes.wordWrap : undefined}
                 containerClassName={props.classes.codeSnippetContainer} />
         </MuiThemeProvider>);
\ No newline at end of file
