X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0..e4f350462118a86831f92eb375c2bc89cbf85920:/src/views-components/webdav-s3-dialog/webdav-s3-dialog.test.tsx?ds=sidebyside

diff --git a/src/views-components/webdav-s3-dialog/webdav-s3-dialog.test.tsx b/src/views-components/webdav-s3-dialog/webdav-s3-dialog.test.tsx
index 67d5aa2e..ec0a9c8a 100644
--- a/src/views-components/webdav-s3-dialog/webdav-s3-dialog.test.tsx
+++ b/src/views-components/webdav-s3-dialog/webdav-s3-dialog.test.tsx
@@ -12,9 +12,6 @@ import { WithDialogProps } from 'store/dialog/with-dialog';
 import { WebDavS3InfoDialogData, COLLECTION_WEBDAV_S3_DIALOG_NAME } from 'store/collections/collection-info-actions';
 import { Provider } from "react-redux";
 import { createStore, combineReducers } from 'redux';
-// import { configureStore, RootStore } from 'store/store';
-// import { createBrowserHistory } from "history";
-// import { createServices } from "services/services";
 
 configure({ adapter: new Adapter() });
 
