X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0..2cec626e679d593d5b208a0807b391ab978e0e9d:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 471ecc40..fe5dff8a 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -14,6 +14,8 @@ import { CustomTheme } from 'common/custom-theme';
 import { createServices } from "services/services";
 import 'jest-localstorage-mock';
 
+jest.mock('views-components/baner/banner', () => ({ Banner: () => 'Banner' }))
+
 const history = createBrowserHistory();
 
 it('renders without crashing', () => {
