X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/3b5edb7ae1de4709acef5d2c58ce12ecf5eb9fcf..refs/heads/14504-users-admin-panel:/src/views/virtual-machine-panel/virtual-machine-panel.tsx?ds=sidebyside

diff --git a/src/views/virtual-machine-panel/virtual-machine-panel.tsx b/src/views/virtual-machine-panel/virtual-machine-panel.tsx
index 5dbd3f09..d5d34555 100644
--- a/src/views/virtual-machine-panel/virtual-machine-panel.tsx
+++ b/src/views/virtual-machine-panel/virtual-machine-panel.tsx
@@ -12,7 +12,7 @@ import { Link } from 'react-router-dom';
 import { compose, Dispatch } from 'redux';
 import { saveRequestedDate, loadVirtualMachinesData } from '~/store/virtual-machines/virtual-machines-actions';
 import { RootState } from '~/store/store';
-import { ListResults } from '~/services/common-service/common-resource-service';
+import { ListResults } from '~/services/common-service/common-service';
 import { HelpIcon, MoreOptionsIcon } from '~/components/icon/icon';
 import { VirtualMachineLogins, VirtualMachinesResource } from '~/models/virtual-machines';
 import { Routes } from '~/routes/routes';
