X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/3b4d9c223bbbd3778063eda39b5bf633b4b47e30..8426035efad90f0745bf1c3e43da3027ef5c2805:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index b781a3a9..6e72ef68 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -32,6 +32,7 @@ export const REPOSITORY_NAME_VALIDATION = [require, maxLength(255)];
 
 export const USER_EMAIL_VALIDATION = [require, maxLength(255)];
 export const PROFILE_EMAIL_VALIDATION = [maxLength(255)];
+export const PROFILE_URL_VALIDATION = [maxLength(255)];
 export const USER_LENGTH_VALIDATION = [maxLength(255)];
 
 export const SSH_KEY_PUBLIC_VALIDATION = [require, isRsaKey, maxLength(1024)];
