X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/394ebdfd13fe40a7096f484c46a353d2537f4c9a..c952afae1af2fb31b68be04f70bd7ae6f9d52aba:/src/views/workbench/workbench.tsx

diff --git a/src/views/workbench/workbench.tsx b/src/views/workbench/workbench.tsx
index 25d70776..e7bb048f 100644
--- a/src/views/workbench/workbench.tsx
+++ b/src/views/workbench/workbench.tsx
@@ -54,7 +54,6 @@ import { AdvancedTabDialog } from 'views-components/advanced-tab-dialog/advanced
 import { ProcessInputDialog } from 'views-components/process-input-dialog/process-input-dialog';
 import { VirtualMachineUserPanel } from 'views/virtual-machine-panel/virtual-machine-user-panel';
 import { VirtualMachineAdminPanel } from 'views/virtual-machine-panel/virtual-machine-admin-panel';
-import { ProjectPropertiesDialog } from 'views-components/project-properties-dialog/project-properties-dialog';
 import { RepositoriesPanel } from 'views/repositories-panel/repositories-panel';
 import { KeepServicePanel } from 'views/keep-service-panel/keep-service-panel';
 import { ApiClientAuthorizationPanel } from 'views/api-client-authorization-panel/api-client-authorization-panel';
@@ -242,7 +241,6 @@ export const WorkbenchPanel =
             <PartialCopyToCollectionDialog />
             <ProcessCommandDialog />
             <ProcessInputDialog />
-            <ProjectPropertiesDialog />
             <RestoreCollectionVersionDialog />
             <RemoveApiClientAuthorizationDialog />
             <RemoveGroupDialog />
