X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/394ebdfd13fe40a7096f484c46a353d2537f4c9a..c79e65e93760c758aa297b9eb5561c69b36a1d46:/src/components/multi-panel-view/multi-panel-view.test.tsx?ds=sidebyside

diff --git a/src/components/multi-panel-view/multi-panel-view.test.tsx b/src/components/multi-panel-view/multi-panel-view.test.tsx
index 6cf13d78..3f4911c2 100644
--- a/src/components/multi-panel-view/multi-panel-view.test.tsx
+++ b/src/components/multi-panel-view/multi-panel-view.test.tsx
@@ -10,7 +10,7 @@ import { Button } from "@material-ui/core";
 
 configure({ adapter: new Adapter() });
 
-const PanelMock = ({panelName, panelMaximized, doHidePanel, doMaximizePanel, children, ...rest}) =>
+const PanelMock = ({panelName, panelMaximized, doHidePanel, doMaximizePanel, doUnMaximizePanel, panelIlluminated, panelRef, children, ...rest}) =>
     <div {...rest}>{children}</div>;
 
 describe('<MPVContainer />', () => {
