X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/38d27e9783f7f760cee84cc225e86144069848c4..e983d1cc16a370a1cf0ab3dccc47049a34ef049d:/src/components/data-explorer/data-explorer.tsx

diff --git a/src/components/data-explorer/data-explorer.tsx b/src/components/data-explorer/data-explorer.tsx
index a38d0ed6..d272e870 100644
--- a/src/components/data-explorer/data-explorer.tsx
+++ b/src/components/data-explorer/data-explorer.tsx
@@ -134,6 +134,8 @@ export const DataExplorer = withStyles(styles)(
                             page={this.props.page}
                             onChangePage={this.changePage}
                             onChangeRowsPerPage={this.changeRowsPerPage}
+                            // Disable next button on empty lists since that's not default behavior
+                            nextIconButtonProps={(itemsAvailable > 0) ? {} : {disabled: true}}
                             component="div" /> : <Button
                                 variant="text"
                                 size="medium"
