X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/36b4e36f75ea0035b6b0de6aaaad4edd3231371c..84c94f372cead175c61c3dd1c69486ce87d91539:/src/views/workflow-panel/workflow-panel.tsx

diff --git a/src/views/workflow-panel/workflow-panel.tsx b/src/views/workflow-panel/workflow-panel.tsx
index c59dc492..99dc9a76 100644
--- a/src/views/workflow-panel/workflow-panel.tsx
+++ b/src/views/workflow-panel/workflow-panel.tsx
@@ -15,7 +15,6 @@ const mapStateToProps = (state: RootState): WorkflowPanelDataProps => ({
 });
 
 const mapDispatchToProps = (dispatch: Dispatch): WorfklowPanelActionProps => ({
-
     handleRowDoubleClick: (uuid: string) => {
         dispatch<any>(navigateTo(uuid));
     },
