X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/35d85b5905b1bfed1d5b7a43882afe79780ee6d2..d1fa1c888be0d956178cc29cd78dbb924a7606c1:/src/views/process-panel/process-log-form.tsx

diff --git a/src/views/process-panel/process-log-form.tsx b/src/views/process-panel/process-log-form.tsx
index 6a8e5221..1f63e28d 100644
--- a/src/views/process-panel/process-log-form.tsx
+++ b/src/views/process-panel/process-log-form.tsx
@@ -40,7 +40,7 @@ type ProcessLogFormProps = ProcessLogFormDataProps & ProcessLogFormActionProps &
 
 export const ProcessLogForm = withStyles(styles)(
     ({ classes, selectedFilter, onChange, filters }: ProcessLogFormProps) =>
-        <form autoComplete="off">
+        <form autoComplete="off" data-cy="process-logs-filter">
             <FormControl className={classes.formControl}>
                 <Select
                     value={selectedFilter.value}
