X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/35cbda6f514ee278d512aa15e1191bed7e6cf7a5..63a5dc75ae9b68b3570e3bee1662155572cf5d1f:/src/views/process-panel/process-log-card.tsx

diff --git a/src/views/process-panel/process-log-card.tsx b/src/views/process-panel/process-log-card.tsx
index 03739699..e14f98f9 100644
--- a/src/views/process-panel/process-log-card.tsx
+++ b/src/views/process-panel/process-log-card.tsx
@@ -55,17 +55,19 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     },
     logViewer: {
         height: '100%',
+        overflowY: 'scroll', // Required for MacOS's Safari -- See #19687
     },
     logViewerContainer: {
         height: '100%',
     },
     title: {
         overflow: 'hidden',
-        paddingTop: theme.spacing.unit * 0.5
+        paddingTop: theme.spacing.unit * 0.5,
+        color: theme.customs.colors.greyD
     },
     iconHeader: {
         fontSize: '1.875rem',
-        color: theme.customs.colors.green700
+        color: theme.customs.colors.greyL
     },
     root: {
         height: '100%',
