X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/34e8ef518dd3c4da8f1ad4b099bfbd99c71fa68f..c59db7f1ffae1a16a5458740510e173582e68925:/src/views/run-process-panel/inputs/int-array-input.tsx

diff --git a/src/views/run-process-panel/inputs/int-array-input.tsx b/src/views/run-process-panel/inputs/int-array-input.tsx
index a878444b..d1c0273a 100644
--- a/src/views/run-process-panel/inputs/int-array-input.tsx
+++ b/src/views/run-process-panel/inputs/int-array-input.tsx
@@ -47,7 +47,7 @@ class InputComponent extends React.PureComponent<GenericInputProps>{
             orderable
             value={this.props.input.value}
             onChange={this.handleChange}
-            createNewValue={identity}
+            createNewValue={value => parseInt(value, 10)}
             inputComponent={IntInput}
             inputProps={{
                 error: this.props.meta.error,
