X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/31ccf5ef29dd45c26633ad7e6c38502a36a3269c..a28f006ec8fc7d0934c07845df56a4c2c6550f61:/src/components/icon/icon.tsx

diff --git a/src/components/icon/icon.tsx b/src/components/icon/icon.tsx
index 289696c6..a64ed0a8 100644
--- a/src/components/icon/icon.tsx
+++ b/src/components/icon/icon.tsx
@@ -59,8 +59,6 @@ import SettingsEthernet from '@material-ui/icons/SettingsEthernet';
 import Star from '@material-ui/icons/Star';
 import StarBorder from '@material-ui/icons/StarBorder';
 import Warning from '@material-ui/icons/Warning';
-import Visibility from '@material-ui/icons/Visibility';
-import VisibilityOff from '@material-ui/icons/VisibilityOff';
 import VpnKey from '@material-ui/icons/VpnKey';
 import LinkOutlined from '@material-ui/icons/LinkOutlined';
 import RemoveRedEye from '@material-ui/icons/RemoveRedEye';
