X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/30d0e55a5b76a6c485737b1b669387bbe5d4dbea..31ccf5ef29dd45c26633ad7e6c38502a36a3269c:/src/components/multi-panel-view/multi-panel-view.tsx

diff --git a/src/components/multi-panel-view/multi-panel-view.tsx b/src/components/multi-panel-view/multi-panel-view.tsx
index 9206811f..f4c3f3ba 100644
--- a/src/components/multi-panel-view/multi-panel-view.tsx
+++ b/src/components/multi-panel-view/multi-panel-view.tsx
@@ -15,7 +15,7 @@ import {
 import { GridProps } from '@material-ui/core/Grid';
 import { isArray } from 'lodash';
 import { DefaultView } from 'components/default-view/default-view';
-import { InfoIcon, InvisibleIcon, VisibleIcon } from 'components/icon/icon';
+import { InfoIcon } from 'components/icon/icon';
 import { ReactNodeArray } from 'prop-types';
 import classNames from 'classnames';
 
