X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/2ab43f230662c3f5d7d7ff75c08bdab0c66b22b0..e4a198bd0cc9ed174cb68345623ce9fbd8923951:/src/views-components/data-explorer/renderers.tsx

diff --git a/src/views-components/data-explorer/renderers.tsx b/src/views-components/data-explorer/renderers.tsx
index 8b29b24d..e854da0e 100644
--- a/src/views-components/data-explorer/renderers.tsx
+++ b/src/views-components/data-explorer/renderers.tsx
@@ -220,7 +220,7 @@ enum UserAccountStatus {
 }
 
 const renderAccountStatus = (props: {status: UserAccountStatus}) =>
-    <Grid container alignItems="center" wrap="nowrap" spacing={8}>
+    <Grid container alignItems="center" wrap="nowrap" spacing={8} data-cy="account-status">
         <Grid item>
             {(() => {
                 switch(props.status) {
