X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/27bcade93df26e25bb2b4aff537875f78d3c1ff5..c1787278642d2ef02234ea27f94aaae9cdd52d40:/src/components/column-selector/column-selector.tsx

diff --git a/src/components/column-selector/column-selector.tsx b/src/components/column-selector/column-selector.tsx
index f2e42dd2..5e4b3397 100644
--- a/src/components/column-selector/column-selector.tsx
+++ b/src/components/column-selector/column-selector.tsx
@@ -9,7 +9,7 @@ import { DataColumn } from '../data-table/data-column';
 import { Popover } from "../popover/popover";
 import { IconButtonProps } from '@material-ui/core/IconButton';
 import { DataColumns } from '../data-table/data-table';
-import { ArvadosTheme } from "../../common/custom-theme";
+import { ArvadosTheme } from "~/common/custom-theme";
 
 interface ColumnSelectorDataProps {
     columns: DataColumns<any>;
