X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/2742a401dcc330697a14d2edb3c4c81115f67402..daa412a179a8d7fec006ae21991a1daaffb9fa3d:/src/views/process-panel/process-details-card.tsx

diff --git a/src/views/process-panel/process-details-card.tsx b/src/views/process-panel/process-details-card.tsx
index 21563c16..da6438a1 100644
--- a/src/views/process-panel/process-details-card.tsx
+++ b/src/views/process-panel/process-details-card.tsx
@@ -41,8 +41,10 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         paddingTop: theme.spacing.unit * 0.5
     },
     content: {
+        padding: theme.spacing.unit * 1.0,
+        paddingTop: theme.spacing.unit * 0.5,
         '&:last-child': {
-            paddingBottom: theme.spacing.unit * 2,
+            paddingBottom: theme.spacing.unit * 1,
         }
     },
     title: {
