X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25c3b17ad0dc0e70b48911c5a818bbcf6851352e..e09a9e644ad7937bb3800ca8096f444f6ff4411b:/src/components/multiselect-toolbar/MultiselectToolbar.tsx?ds=sidebyside

diff --git a/src/components/multiselect-toolbar/MultiselectToolbar.tsx b/src/components/multiselect-toolbar/MultiselectToolbar.tsx
index d9024cd1..30d5bd79 100644
--- a/src/components/multiselect-toolbar/MultiselectToolbar.tsx
+++ b/src/components/multiselect-toolbar/MultiselectToolbar.tsx
@@ -42,6 +42,7 @@ type CssRules = "root" | "transition" | "button" | "iconContainer";
 const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     root: {
         display: "flex",
+        flexShrink: 0,
         flexDirection: "row",
         width: 0,
         height: '2.7rem',
