X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..fb10daa75864def53d1f0ffa7da3cece8cebe9d0:/src/components/workflow-inputs-form/workflow-input.tsx

diff --git a/src/components/workflow-inputs-form/workflow-input.tsx b/src/components/workflow-inputs-form/workflow-input.tsx
index 39194445..d555d3cc 100644
--- a/src/components/workflow-inputs-form/workflow-input.tsx
+++ b/src/components/workflow-inputs-form/workflow-input.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { CommandInputParameter } from 'models/workflow';
 import { TextField } from '@material-ui/core';
 import { required } from 'components/workflow-inputs-form/validators';
