X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..d53a08ea0cc9a9af1a3071969d41165e8a6ff5d5:/src/views/login-panel/login-panel.tsx

diff --git a/src/views/login-panel/login-panel.tsx b/src/views/login-panel/login-panel.tsx
index 679551e1..110097be 100644
--- a/src/views/login-panel/login-panel.tsx
+++ b/src/views/login-panel/login-panel.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { connect, DispatchProp } from 'react-redux';
 import { Grid, Typography, Button, Select } from '@material-ui/core';
 import { StyleRulesCallback, WithStyles, withStyles } from '@material-ui/core/styles';
@@ -51,7 +51,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
 });
 
 const doPasswordLogin = (url: string) => (username: string, password: string) => {
-    const formData = [];
+    const formData: string[] = [];
     formData.push('username='+encodeURIComponent(username));
     formData.push('password='+encodeURIComponent(password));
     return Axios.post(`${url}/arvados/v1/users/authenticate`, formData.join('&'), {
