X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..80852d13ef70331d0b5dcb7c0741956967129728:/src/views-components/dialog-update/dialog-process-update.tsx

diff --git a/src/views-components/dialog-update/dialog-process-update.tsx b/src/views-components/dialog-update/dialog-process-update.tsx
index 8112edfd..8b8f432c 100644
--- a/src/views-components/dialog-update/dialog-process-update.tsx
+++ b/src/views-components/dialog-update/dialog-process-update.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { InjectedFormProps } from 'redux-form';
 import { WithDialogProps } from 'store/dialog/with-dialog';
 import { ProcessUpdateFormDialogData } from 'store/processes/process-update-actions';
