X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..8045851b13e03215f3f2c8be6d54b43bd4619862:/src/views/not-found-panel/not-found-panel.tsx

diff --git a/src/views/not-found-panel/not-found-panel.tsx b/src/views/not-found-panel/not-found-panel.tsx
index d1fb3f99..148c331e 100644
--- a/src/views/not-found-panel/not-found-panel.tsx
+++ b/src/views/not-found-panel/not-found-panel.tsx
@@ -4,7 +4,7 @@
 
 import { RootState } from 'store/store';
 import { connect } from 'react-redux';
-import { NotFoundPanelRoot, NotFoundPanelRootDataProps, NotFoundPanelOwnProps } from 'views/not-found-panel/not-found-panel-root';
+import { NotFoundPanelRoot, NotFoundPanelRootDataProps } from 'views/not-found-panel/not-found-panel-root';
 
 const mapStateToProps = (state: RootState): NotFoundPanelRootDataProps => {
     return {
@@ -15,5 +15,5 @@ const mapStateToProps = (state: RootState): NotFoundPanelRootDataProps => {
 
 const mapDispatchToProps = null;
 
-export const NotFoundPanel = connect<NotFoundPanelRootDataProps, null, NotFoundPanelOwnProps>(mapStateToProps, mapDispatchToProps)
-    (NotFoundPanelRoot);
+export const NotFoundPanel = connect(mapStateToProps, mapDispatchToProps)
+    (NotFoundPanelRoot) as any;
