X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..76fe6edc8d158f67c600f75c6bb351d7a679b71e:/src/components/switch-field/switch-field.tsx

diff --git a/src/components/switch-field/switch-field.tsx b/src/components/switch-field/switch-field.tsx
index faa2f9c4..0c63a36c 100644
--- a/src/components/switch-field/switch-field.tsx
+++ b/src/components/switch-field/switch-field.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { FormFieldProps, FormField } from 'components/form-field/form-field';
 import { Switch } from '@material-ui/core';
 import { SwitchProps } from '@material-ui/core/Switch';
