X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..76b1c50413fee98f2ff8a3d2308252de6a37048c:/src/views/site-manager-panel/site-manager-panel-root.tsx

diff --git a/src/views/site-manager-panel/site-manager-panel-root.tsx b/src/views/site-manager-panel/site-manager-panel-root.tsx
index f971c534..246bc875 100644
--- a/src/views/site-manager-panel/site-manager-panel-root.tsx
+++ b/src/views/site-manager-panel/site-manager-panel-root.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import {
     Card,
     CardContent,
@@ -187,7 +187,7 @@ export const SiteManagerPanelRoot = compose(
                             <Field
                                 name='remoteHost'
                                 validate={SITE_MANAGER_REMOTE_HOST_VALIDATION}
-                                component={TextField}
+                                component={TextField as any}
                                 placeholder="zzzz.arvadosapi.com"
                                 margin="normal"
                                 label="New cluster"
