X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..51f7337782c238ecb7d43490268bf90b856150a2:/src/views/run-process-panel/run-process-second-step.tsx

diff --git a/src/views/run-process-panel/run-process-second-step.tsx b/src/views/run-process-panel/run-process-second-step.tsx
index 3b07e635..08cf4e6c 100644
--- a/src/views/run-process-panel/run-process-second-step.tsx
+++ b/src/views/run-process-panel/run-process-second-step.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { Grid, Button } from '@material-ui/core';
 import { RunProcessBasicForm, RUN_PROCESS_BASIC_FORM } from './run-process-basic-form';
 import { RunProcessInputsForm } from 'views/run-process-panel/run-process-inputs-form';
