X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..3e3eaa213219ebcac9b52c8fbe3ec3ef7c39c863:/src/views-components/dialog-copy/dialog-collection-partial-copy.tsx

diff --git a/src/views-components/dialog-copy/dialog-collection-partial-copy.tsx b/src/views-components/dialog-copy/dialog-collection-partial-copy.tsx
index 934ad57a..7a3c5fdd 100644
--- a/src/views-components/dialog-copy/dialog-collection-partial-copy.tsx
+++ b/src/views-components/dialog-copy/dialog-collection-partial-copy.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { memoize } from "lodash/fp";
 import { FormDialog } from 'components/form-dialog/form-dialog';
 import { CollectionNameField, CollectionDescriptionField, CollectionProjectPickerField } from 'views-components/form-fields/collection-form-fields';
