X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0:/src/views/site-manager-panel/site-manager-panel-root.tsx

diff --git a/src/views/site-manager-panel/site-manager-panel-root.tsx b/src/views/site-manager-panel/site-manager-panel-root.tsx
index f971c534..45f0a116 100644
--- a/src/views/site-manager-panel/site-manager-panel-root.tsx
+++ b/src/views/site-manager-panel/site-manager-panel-root.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import {
     Card,
     CardContent,
