X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0:/src/views-components/form-fields/project-form-fields.tsx?ds=inline

diff --git a/src/views-components/form-fields/project-form-fields.tsx b/src/views-components/form-fields/project-form-fields.tsx
index 3c25d9a1..be762b51 100644
--- a/src/views-components/form-fields/project-form-fields.tsx
+++ b/src/views-components/form-fields/project-form-fields.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { Field, Validator } from "redux-form";
 import { TextField, RichEditorTextField } from "components/text-field/text-field";
 import { PROJECT_NAME_VALIDATION, PROJECT_NAME_VALIDATION_ALLOW_SLASH } from "validators/validators";
