X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..22b351e5d49e861d1b1f73b87689e986002cb08a:/src/views/process-log-panel/process-log-code-snippet.tsx

diff --git a/src/views/process-log-panel/process-log-code-snippet.tsx b/src/views/process-log-panel/process-log-code-snippet.tsx
index dd5fea06..d1756c77 100644
--- a/src/views/process-log-panel/process-log-code-snippet.tsx
+++ b/src/views/process-log-panel/process-log-code-snippet.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { MuiThemeProvider, createMuiTheme, StyleRulesCallback, withStyles, WithStyles } from '@material-ui/core/styles';
 import { CodeSnippet } from 'components/code-snippet/code-snippet';
 import grey from '@material-ui/core/colors/grey';
