X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..20063f6f7bb9ad7c6a9a0b49b3c5ba4b0abc532e:/src/views-components/details-panel/file-details.tsx?ds=sidebyside

diff --git a/src/views-components/details-panel/file-details.tsx b/src/views-components/details-panel/file-details.tsx
index b20cd4e0..7c11eb8b 100644
--- a/src/views-components/details-panel/file-details.tsx
+++ b/src/views-components/details-panel/file-details.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { DetailsData } from "./details-data";
 import { CollectionFile, CollectionDirectory, CollectionFileType } from 'models/collection-file';
 import { getIcon } from 'components/file-tree/file-tree-item';
