X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/23180724fefb8b4b31e2c07e711101367942f721..25216cc7acedc987c26a159f0b640210c0ef101e:/src/views/run-process-panel/inputs/int-array-input.tsx?ds=sidebyside

diff --git a/src/views/run-process-panel/inputs/int-array-input.tsx b/src/views/run-process-panel/inputs/int-array-input.tsx
index 22c069b5..a299bd87 100644
--- a/src/views/run-process-panel/inputs/int-array-input.tsx
+++ b/src/views/run-process-panel/inputs/int-array-input.tsx
@@ -3,13 +3,13 @@
 // SPDX-License-Identifier: AGPL-3.0
 
 import * as React from 'react';
-import { isRequiredInput, IntArrayCommandInputParameter } from '~/models/workflow';
+import { isRequiredInput, IntArrayCommandInputParameter } from 'models/workflow';
 import { Field } from 'redux-form';
-import { ERROR_MESSAGE } from '~/validators/require';
-import { GenericInputProps, GenericInput } from '~/views/run-process-panel/inputs/generic-input';
-import { ChipsInput } from '~/components/chips-input/chips-input';
+import { ERROR_MESSAGE } from 'validators/require';
+import { GenericInputProps, GenericInput } from 'views/run-process-panel/inputs/generic-input';
+import { ChipsInput } from 'components/chips-input/chips-input';
 import { createSelector } from 'reselect';
-import { IntInput } from '~/components/int-input/int-input';
+import { IntInput } from 'components/int-input/int-input';
 
 export interface IntArrayInputProps {
     input: IntArrayCommandInputParameter;
@@ -46,7 +46,7 @@ class InputComponent extends React.PureComponent<GenericInputProps>{
             deletable={!commandInput.disabled}
             orderable={!commandInput.disabled}
             disabled={commandInput.disabled}
-            value={input.value}
+            values={input.value}
             onChange={this.handleChange}
             createNewValue={value => parseInt(value, 10)}
             inputComponent={IntInput}
