X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/2129d2a8fc553a0e89b374bdad2226ff3b3d377e..da5e144c103d5abb2bca727f40a14e5da052264e:/src/views/run-process-panel/run-process-basic-form.tsx

diff --git a/src/views/run-process-panel/run-process-basic-form.tsx b/src/views/run-process-panel/run-process-basic-form.tsx
index a8005ad2..32a126a4 100644
--- a/src/views/run-process-panel/run-process-basic-form.tsx
+++ b/src/views/run-process-panel/run-process-basic-form.tsx
@@ -29,7 +29,7 @@ export const RunProcessBasicForm =
                     <Field
                         name='name'
                         component={TextField as any}
-                        label="Enter a new name for run process"
+                        label="Name for this workflow run"
                         required
                         validate={PROCESS_NAME_VALIDATION} />
                 </Grid>
@@ -37,7 +37,7 @@ export const RunProcessBasicForm =
                     <Field
                         name='description'
                         component={TextField as any}
-                        label="Enter a description for run process" />
+                        label="Optional description of this workflow run" />
                 </Grid>
                 <Grid item xs={12} md={6}>
                     <ProjectInput input={{
