X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/1f2ddfbf602cfa8c0dca0d81e3f2676904dd4c80..031e32ec7eeeeb5b92448ec906856009148efea6:/src/components/column-selector/column-selector.tsx

diff --git a/src/components/column-selector/column-selector.tsx b/src/components/column-selector/column-selector.tsx
index 63934ddb..3ab38d4d 100644
--- a/src/components/column-selector/column-selector.tsx
+++ b/src/components/column-selector/column-selector.tsx
@@ -10,7 +10,6 @@ import { Popover } from "../popover/popover";
 import { IconButtonProps } from '@material-ui/core/IconButton';
 import { DataColumns } from '../data-table/data-table';
 import { ArvadosTheme } from "common/custom-theme";
-import { ResourceName } from 'views-components/data-explorer/renderers';
 
 interface ColumnSelectorDataProps {
     columns: DataColumns<any>;
