X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/1f1c5dbbad160ef2cc7dc0a2cd736fefd5025d1e..ef8180fa2f0b90b1656b1d8c7ef12bc6ea028a0a:/src/views-components/search-bar/search-bar-view.tsx

diff --git a/src/views-components/search-bar/search-bar-view.tsx b/src/views-components/search-bar/search-bar-view.tsx
index 7f5c1566..28408347 100644
--- a/src/views-components/search-bar/search-bar-view.tsx
+++ b/src/views-components/search-bar/search-bar-view.tsx
@@ -128,10 +128,10 @@ const handleKeyDown = (e: React.KeyboardEvent, props: SearchBarViewProps) => {
 const handleInputClick = (e: React.MouseEvent, props: SearchBarViewProps) => {
     if (props.searchValue) {
         props.onSetView(SearchView.AUTOCOMPLETE);
-        props.openSearchView();
     } else {
         props.onSetView(SearchView.BASIC);
     }
+    props.openSearchView();
 };
 
 const handleDropdownClick = (e: React.MouseEvent, props: SearchBarViewProps) => {
