X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/1e5b9cce5a4bb83fe958f1a0a1a47c6748b8ea86..58db72fee358d5987139a1b8526c0ca873e07dbf:/src/views/run-process-panel/inputs/enum-input.tsx

diff --git a/src/views/run-process-panel/inputs/enum-input.tsx b/src/views/run-process-panel/inputs/enum-input.tsx
index 3b0289e7..f554aff2 100644
--- a/src/views/run-process-panel/inputs/enum-input.tsx
+++ b/src/views/run-process-panel/inputs/enum-input.tsx
@@ -2,10 +2,10 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { Field } from 'redux-form';
 import { Select, MenuItem } from '@material-ui/core';
-import { EnumCommandInputParameter, CommandInputEnumSchema } from '~/models/workflow';
+import { EnumCommandInputParameter, CommandInputEnumSchema } from 'models/workflow';
 import { GenericInputProps, GenericInput } from './generic-input';
 
 export interface EnumInputProps {
