X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/1e2635886e1342a7b29914d3a437313807676466..e4de9a43cee1a8859cb2a42ea01723d632621ce4:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 29eed602..645b8aae 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -7,7 +7,7 @@ import * as ReactDOM from 'react-dom';
 import { WorkbenchPanel } from './workbench';
 import { Provider } from "react-redux";
 import { configureStore } from "~/store/store";
-import createBrowserHistory from "history/createBrowserHistory";
+import { createBrowserHistory } from "history";
 import { ConnectedRouter } from "react-router-redux";
 import { MuiThemeProvider } from '@material-ui/core/styles';
 import { CustomTheme } from '~/common/custom-theme';
