X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/18e2272d85785c4fec83ae2b2b274ccfcfc2fec5..9555a2020771863c2e4f6b8802bd6850efb37713:/src/views-components/context-menu/context-menu.tsx

diff --git a/src/views-components/context-menu/context-menu.tsx b/src/views-components/context-menu/context-menu.tsx
index 219913cd..ee87d71a 100644
--- a/src/views-components/context-menu/context-menu.tsx
+++ b/src/views-components/context-menu/context-menu.tsx
@@ -67,8 +67,10 @@ export enum ContextMenuKind {
     API_CLIENT_AUTHORIZATION = "ApiClientAuthorization",
     ROOT_PROJECT = "RootProject",
     PROJECT = "Project",
+    FILTER_GROUP = "FilterGroup",
     READONLY_PROJECT = 'ReadOnlyProject',
     PROJECT_ADMIN = "ProjectAdmin",
+    FILTER_GROUP_ADMIN = "FilterGroupAdmin",
     RESOURCE = "Resource",
     FAVORITE = "Favorite",
     TRASH = "Trash",
@@ -85,6 +87,7 @@ export enum ContextMenuKind {
     PROCESS = "Process",
     PROCESS_ADMIN = 'ProcessAdmin',
     PROCESS_RESOURCE = 'ProcessResource',
+    READONLY_PROCESS_RESOURCE = 'ReadOnlyProcessResource',
     PROCESS_LOGS = "ProcessLogs",
     REPOSITORY = "Repository",
     SSH_KEY = "SshKey",
