X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/172ba18e43743d90b8a1110d62209be2ab7627d1..e3ca6297f8ec9f3504074291ce6cd10babeb69bf:/src/components/file-upload/file-upload.tsx

diff --git a/src/components/file-upload/file-upload.tsx b/src/components/file-upload/file-upload.tsx
index 579746a6..54d5b5db 100644
--- a/src/components/file-upload/file-upload.tsx
+++ b/src/components/file-upload/file-upload.tsx
@@ -123,6 +123,17 @@ export const FileUpload = withStyles(styles)(
             if (!disabled) {
                 onDelete(file);
             }
+
+            let interval = setInterval(() => {
+                const key = Object.keys((window as any).cancelTokens).find(key => key.indexOf(file.file.name) > -1);
+
+                if (key) {
+                    clearInterval(interval);
+                    (window as any).cancelTokens[key]();
+                    delete (window as any).cancelTokens[key];
+                }
+            }, 100);
+
         }
         render() {
             const { classes, onDrop, disabled, files } = this.props;
