X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/15b6918d498bec312bea23e5277db2997b040279..d4d0208892ea0f0f4bf79691770b14aca89db92b:/src/views-components/details-panel/project-details.tsx?ds=sidebyside

diff --git a/src/views-components/details-panel/project-details.tsx b/src/views-components/details-panel/project-details.tsx
index 8ed15b31..d4100767 100644
--- a/src/views-components/details-panel/project-details.tsx
+++ b/src/views-components/details-panel/project-details.tsx
@@ -37,8 +37,8 @@ type CssRules = 'tag' | 'editIcon' | 'editButton';
 
 const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     tag: {
-        marginRight: theme.spacing.unit,
-        marginBottom: theme.spacing.unit
+        marginRight: theme.spacing.unit / 2,
+        marginBottom: theme.spacing.unit / 2,
     },
     editIcon: {
         paddingRight: theme.spacing.unit/2,
