X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/158a4936f754ad78004e1bbcbb5af053a6a4073a..bef6136ae8f4e6d2ebae630940018a99946e6bda:/src/components/file-upload-dialog/file-upload-dialog.tsx

diff --git a/src/components/file-upload-dialog/file-upload-dialog.tsx b/src/components/file-upload-dialog/file-upload-dialog.tsx
index a7644112..7810c491 100644
--- a/src/components/file-upload-dialog/file-upload-dialog.tsx
+++ b/src/components/file-upload-dialog/file-upload-dialog.tsx
@@ -49,4 +49,4 @@ export const FilesUploadDialog = (props: FilesUploadDialogProps & WithDialogProp
                     : 'Upload data'}
             </Button>
         </DialogActions>
-    </Dialog>;
\ No newline at end of file
+    </Dialog>;
