X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/1514f6a2ae8103f75f08034299115ad751d8a785..3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0:/src/views/main-panel/main-panel-root.tsx

diff --git a/src/views/main-panel/main-panel-root.tsx b/src/views/main-panel/main-panel-root.tsx
index 15149dce..5853acb0 100644
--- a/src/views/main-panel/main-panel-root.tsx
+++ b/src/views/main-panel/main-panel-root.tsx
@@ -2,14 +2,15 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { StyleRulesCallback, WithStyles, withStyles, Grid, LinearProgress } from '@material-ui/core';
-import { User } from "~/models/user";
-import { ArvadosTheme } from '~/common/custom-theme';
-import { WorkbenchPanel } from '~/views/workbench/workbench';
-import { LoginPanel } from '~/views/login-panel/login-panel';
-import { WorkbenchLoadingScreen } from '~/views/workbench/workbench-loading-screen';
-import { MainAppBar } from '~/views-components/main-app-bar/main-app-bar';
+import { User } from "models/user";
+import { ArvadosTheme } from 'common/custom-theme';
+import { WorkbenchPanel } from 'views/workbench/workbench';
+import { LoginPanel } from 'views/login-panel/login-panel';
+import { InactivePanel } from 'views/inactive-panel/inactive-panel';
+import { WorkbenchLoadingScreen } from 'views/workbench/workbench-loading-screen';
+import { MainAppBar } from 'views-components/main-app-bar/main-app-bar';
 
 type CssRules = 'root';
 
@@ -26,22 +27,36 @@ export interface MainPanelRootDataProps {
     working: boolean;
     loading: boolean;
     buildInfo: string;
+    uuidPrefix: string;
+    isNotLinking: boolean;
+    isLinkingPath: boolean;
+    siteBanner: string;
+    sessionIdleTimeout: number;
 }
 
 type MainPanelRootProps = MainPanelRootDataProps & WithStyles<CssRules>;
 
 export const MainPanelRoot = withStyles(styles)(
-    ({ classes, loading, working, user, buildInfo }: MainPanelRootProps) =>
-        loading 
+    ({ classes, loading, working, user, buildInfo, uuidPrefix,
+        isNotLinking, isLinkingPath, siteBanner, sessionIdleTimeout }: MainPanelRootProps) =>
+        loading
             ? <WorkbenchLoadingScreen />
             : <>
-                <MainAppBar
+                {isNotLinking && <MainAppBar
                     user={user}
-                    buildInfo={buildInfo}>
-                    {working ? <LinearProgress color="secondary" /> : null}
-                </MainAppBar>
+                    buildInfo={buildInfo}
+                    uuidPrefix={uuidPrefix}
+                    siteBanner={siteBanner}>
+                    {working
+                        ? <LinearProgress color="secondary" data-cy="linear-progress" />
+                        : null}
+                </MainAppBar>}
                 <Grid container direction="column" className={classes.root}>
-                    {user ? <WorkbenchPanel /> : <LoginPanel />}
+                    {user
+                        ? (user.isActive || (!user.isActive && isLinkingPath)
+                            ? <WorkbenchPanel isNotLinking={isNotLinking} isUserActive={user.isActive} sessionIdleTimeout={sessionIdleTimeout} />
+                            : <InactivePanel />)
+                        : <LoginPanel />}
                 </Grid>
             </>
-);
\ No newline at end of file
+);
