X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/14e2af3f458ac220ff88cb059cea7f3568595cfc..bead3b2896eaaceb9b9a3c805d40e8048c93b218:/src/components/multiselect-toolbar/MultiselectToolbar.tsx

diff --git a/src/components/multiselect-toolbar/MultiselectToolbar.tsx b/src/components/multiselect-toolbar/MultiselectToolbar.tsx
index 780d7c43..72d375ff 100644
--- a/src/components/multiselect-toolbar/MultiselectToolbar.tsx
+++ b/src/components/multiselect-toolbar/MultiselectToolbar.tsx
@@ -62,9 +62,6 @@ export const MultiselectToolbar = connect(
 
         const currentPathIsTrash = window.location.pathname === "/trash";
 
-console.log(currentPathIsTrash && selectedToKindSet(checkedList).size)
-
-
         const actions =
             currentPathIsTrash && selectedToKindSet(checkedList).size
                 ? [msToggleTrashAction]
