X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/10ce16c28de952f6533ca3cc9df909269e3d2a53..cba0f400f56889778321bdc0fdcf6cee236f6a79:/src/components/data-table-filters/data-table-filters.test.tsx

diff --git a/src/components/data-table-filters/data-table-filters.test.tsx b/src/components/data-table-filters/data-table-filters.test.tsx
index b0a84b51..9a3fa4dc 100644
--- a/src/components/data-table-filters/data-table-filters.test.tsx
+++ b/src/components/data-table-filters/data-table-filters.test.tsx
@@ -4,7 +4,7 @@
 
 import * as React from "react";
 import { mount, configure } from "enzyme";
-import { DataTableFilters, DataTableFilterItem } from "./data-table-filters";
+import { DataTableFilters } from "./data-table-filters";
 import * as Adapter from 'enzyme-adapter-react-16';
 import { Checkbox, ButtonBase, ListItem, Button, ListItemText } from "@material-ui/core";
 
